Contents
Wireless Network Adapter Setup

IRQ Level

The interrupt level of Wireless network adapter.

IO Port Address

 	The IO Port Address ranged from 0x100 to 0x600 step by 0x40

such as 0x100, 0x140,0x180,.......0x600

Default Channel

When the station acting as the first station in the IBSS, the station operates at the default channel.

ESSID

The ESSID indicates the identity of an Extended Service Set(ESS) or Independent BSS(IBSS).

RTSThreshold

RTSThreshold ranged from 50 to 2300 step 50.

Network Type

Ad hoc Network: This type of IEEE 802.11 wireless LAN is often formed without pre-planning, for only as long as the LAN is needed. In this network type, your computer is able to ommunicate eath other directly without an access point.

Infrastructure Network:An infrastructure network of IEEE 802.11 wireless LAN contains one or more access points. In this network type, your computer is able to access to the wireless LAN and wired LAN (i.e., Ethernet), via an associated access point.